From 4f6e6247f9a672770a6d7a55a3aa2709a860ff38 Mon Sep 17 00:00:00 2001
From: John MacFarlane <jgm@berkeley.edu>
Date: Sun, 15 Jan 2017 20:42:00 +0100
Subject: Made `smart` extension default for pandoc markdown.

Updated tests.
---
 tests/tables.mediawiki | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'tests/tables.mediawiki')

diff --git a/tests/tables.mediawiki b/tests/tables.mediawiki
index 614c3eea1..ce7c17887 100644
--- a/tests/tables.mediawiki
+++ b/tests/tables.mediawiki
@@ -75,7 +75,7 @@ Simple table indented two spaces:
 Multiline table with caption:
 
 {|
-|+ Here's the caption. It may span multiple lines.
+|+ Here’s the caption. It may span multiple lines.
 !align="center" width="15%"| Centered Header
 !width="13%"| Left Aligned
 !align="right" width="16%"| Right Aligned
@@ -89,7 +89,7 @@ Multiline table with caption:
 |align="center"| Second
 | row
 |align="right"| 5.0
-| Here's another one. Note the blank line between rows.
+| Here’s another one. Note the blank line between rows.
 |}
 
 Multiline table without caption:
@@ -108,7 +108,7 @@ Multiline table without caption:
 |align="center"| Second
 | row
 |align="right"| 5.0
-| Here's another one. Note the blank line between rows.
+| Here’s another one. Note the blank line between rows.
 |}
 
 Table without column headers:
@@ -141,6 +141,6 @@ Multiline table without column headers:
 |align="center"| Second
 | row
 |align="right"| 5.0
-| Here's another one. Note the blank line between rows.
+| Here’s another one. Note the blank line between rows.
 |}
 
-- 
cgit v1.2.3

