From 77a40d6f341933b136c6ddd54f2568152b4b31ef Mon Sep 17 00:00:00 2001
From: John MacFarlane <jgm@berkeley.edu>
Date: Tue, 27 Nov 2018 14:45:39 -0800
Subject: MediaWiki writer: fix caption, use 'thumb' instead of 'frame'.

Captions used to have the word 'caption' prepended; this
has been removed.

Also, 'thumb' is used instead of 'frame' to allow images
to be resized.

Closes #5105.
---
 test/writer.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'test/writer.mediawiki')

diff --git a/test/writer.mediawiki b/test/writer.mediawiki
index 968eef388..29686f3e7 100644
--- a/test/writer.mediawiki
+++ b/test/writer.mediawiki
@@ -620,7 +620,7 @@ Auto-links should not occur here: <code>&lt;http://example.com/&gt;</code>
 
 From “Voyage dans la Lune” by Georges Melies (1902):
 
-[[File:lalune.jpg|frame|none|alt=Voyage dans la Lune|caption lalune]]
+[[File:lalune.jpg|thumb|none|alt=Voyage dans la Lune|lalune]]
 
 Here is a movie [[File:movie.jpg|movie]] icon.
 
-- 
cgit v1.2.3

