From 708973a33a0ce425bb21a5ffa06fbdab465d3fb8 Mon Sep 17 00:00:00 2001
From: John MacFarlane <jgm@berkeley.edu>
Date: Thu, 25 May 2017 12:50:43 +0200
Subject: Added `spaced_reference_links` extension.

This is now the default for pandoc's Markdown.
It allows whitespace between the two parts of a
reference link:  e.g.

    [a] [b]

    [b]: url

This is now forbidden by default.

Closes #2602.
---
 test/writer.mediawiki | 4 ----
 1 file changed, 4 deletions(-)

(limited to 'test/writer.mediawiki')

diff --git a/test/writer.mediawiki b/test/writer.mediawiki
index a0dc15fae..968eef388 100644
--- a/test/writer.mediawiki
+++ b/test/writer.mediawiki
@@ -571,10 +571,6 @@ Just a [[url/|URL]].
 
 Foo [[url/|bar]].
 
-Foo [[url/|bar]].
-
-Foo [[url/|bar]].
-
 With [[url/|embedded [brackets]]].
 
 [[url/|b]] by itself should be a link.
-- 
cgit v1.2.3

